a.h.e.l.p.g

by gesc321

Rating: everyone
Tags: Random
Length: 101

unknown

Published 1970-01-01 00:00:00 UTC
Last updated 2013-08-04 17:46:26 UTC

menumenumenu

victim#1 found dissected  and missing right lung

victim#2 found dissected and missing heart and kidney

              victim# 15found dissected and heart was found under ground beneath the corpse was oozing green mold like

substence

news paper article: unknown killer strikes again suspect doctor rithe charge when entered suspects home he had photos of the 17 victims he said after the first five he had the under surveillance when testing hoof prints the killer must have used gloves because there were none as said by police when the princess and Luna were questioned thy said that the guards would be on patrol