Fallen

by Sagltypes

Rating: everyone
Tags:
Length: 137

Will be added

Will be added

Published 1970-01-01 00:00:00 UTC
Last updated 2013-08-11 02:09:36 UTC

Chapter 1

There once was a world

With two ruling gods

They ruled in balance

With them the world thrived

Then came a third

Both handsome and cruel

Seduced the two leaders

And tore them apart

The leaders fought on

And light banished dark

The harmony broken

In one fatal spark

The cruel one took power

When the gods were weak

One weighted with sorrow

The other hate and lost pride

He ruled for a century

Till in desperation

The light god attacked him

Turned him into stone

A thousand years later

Harmony has returned

All is well for a while

Until chaos returns

Image warped by time in stone

He didn't last long

And the order is restored

Throughout the land

Then came the princess

A newly forged god

Three leaders again

History would repeat