The Owl in the Window

by Dimwik

Rating: everyone
Tags:
Length: 146

Changeling prisoner bonds with a mysterious owl, while being interrogated by a powerful unicorn

He has never had a name, they never really needed one, but as long as he was in this cell, he decided his name was…
Bedframe, yes his name is obviously Bedframe.

Bedframe is captured by the royal canterlot guard and thrown into a world of cruel interrogation, and ruthless tactics.
But just as all hope is lost (not that he had much to begin with) he finds an unlikely friend on the other side of the bars
Now he must survive against Celestia's greatest asset

Typical captured changeling story with Twilight and her pet (No not spike, the other one)

Published 1970-01-01 00:00:00 UTC
Last updated 2013-08-23 11:20:40 UTC

Prisoner Report

Prisoner Report

The Changeling was found near the south western edge of Everfree.

It was captured in a typical Hornblaze sneak attack. For more information on the capture, refer to captain sparkle's full report

It hasn't given any information since it's capture and remains uncooperative with any interrogators

Has escaped it's cell multiple times. Once during a transfer from its original cell to solitary confinement, twice during

meal delivery, and once from a tunnel in its original cell. none of the attempts were successful.

The guards have received two broken legs and a shattered wing have from said escape attempts

It is rather small considering the average for their species.

From hole spacing and the horn spiral, is from hive Carapace

Signs of starvation and severe dehydration apparent

Seeking approval from captain Sparkle for tier 6 interrogation, awaiting a response,

Sincerely

Warden Brokenlight