Akai hoshi no yoake

by Hegamonia

Rating: teen
Tags: Crossover, Human, Dark, Alternate Universe, Adventure
Length: 318

The time is near...

Time draws near, as the last forces humanity has left to stand against Celestia and her Conversion Bureau dwindle more and more, they turn to other means of survival. Like a cornered animal, they fought savagely, using the natural advantages that the arctic poles seem to have against her shield, slowing it's progress severely. With this new-found resistor, will it buy Humanity enough time to escape the confines of their planet, or will it all be for naught?

Teen for some possible swearing, gore, and guaranteed death
Pre Season 3, but after invasion of Canterlot

Published 1970-01-01 00:00:00 UTC
Last updated 2013-12-16 04:27:06 UTC

Negau

"Keizoku wa chikara nari"

Never give up, never give in

"Tell me, what the hell's going on out there?"

"The usual seismic activity, her shield has moved a few more inches"

"Damn! I thought you said it would stall her shield!"

"It is, but it still makes progress, but in bursts"

"If this keeps up we'll need to do the test in the atmosphere, very destructive might I add, if it works"

"Doesn't matter, how long until we can use the Fold Drive?"

"Well, projected estimates suggest in a few weeks"

"We don't have a few weeks!"

"I know, but I have found a way to further extend out life, you know that the fold drive requires a dedicated fusion reactor, we could use the shield we designed for the reactor and upscale it, something large enough to cover the facility"

"What? Like in Stargate?"

"Put bluntly yes"

"And if this shield of yours doesn't work?"

"It will, trust me, it will work"

"How do you know?"

"Because I designed one already, and have done a small test"

"God Dammit, man! Stop doing these unauthorized experiments or I'll arrest you for abuse of research equipment!"

"Alright, alright, sheesh"

"Thank you,  now, you said you already built a small-scale model, how long would it take to cover this entire area?"

"A few days to build the generators, another two to set them up, one to wire them, and one more to activate them"

"One week, huh? Not bad"

"Yes... only problem is that the barrier will be almost on top of them by then"

"Cutting it a little close, aren't we doc?"

"We have no choice, we need the extra time to prep the drive, any less and it will result in drastic side-effects"

"I'm authorizing the building of the generators, don't worry"

"I thank you, Commander"

"Yeah, just get us that FTL drive and then thank yourself"