Long-term Coma

by Miyake Books

Rating: everyone
Tags: Sad
Length: 60

We don't have a description. Sorry.

We don't have a description. Sorry.

Published 1970-01-01 00:00:00 UTC
Last updated 2014-01-23 15:39:21 UTC

TWILIGHT - Chapter One

I can't remember so much from this 8-month coma, but there are now just a few things I can do: breathe, walk, and cry. Since I've been learning to do more things, I will feel better in about two years. However, I've been pretty quiet against Spike and very sensitive with these other six ponies.