the life of the princesses

by storyreader265

Rating: everyone
Tags: Sad, Adventure
Length: 226

why do sisters haft to be apart

why do sisters haft to be apart? well it seems they have powers that are opposites!

Published 1970-01-01 00:00:00 UTC
Last updated 2014-04-06 01:20:35 UTC

the begining

it all started when queen viola had 2 babies. one was blue and had a white mane, she was called flurrie. the other was red and had a red and yellow mane, she was called diana. these two sisters were born in canterlot and would spend lots of time with celetia. lots of ponies loved being around them. king kloring didn't like the two daughters because of there powers, he thought they would take over. the king would lock them in different rooms when the queen wasn't there. one day viola thought no one was getting along, she went on youtube and typed in "my little dashie". soon the dad and kids started crying. viola looked at there faces and cried. she knew they were bonding and wanted to be together. the dad wrapped his wings around the girls and kissed them.the girls walked to there room and  held each other. Flurrie said " Don't leave me ok" "ok, i promise" said diana. the next day kloring was not acting natural, he kept the girls together. the next day the two sisters got into a fight "what do you mean you don't know where the celestia doll is!" yelled diana."I just don't know where she is!" they soon stayed away from each other and started hating each other. the dad planed this all along.