Failure

by Manes

Rating: everyone
Tags: Sad
Length: 108

This is the life of a failure.

Published 1970-01-01 00:00:00 UTC
Last updated 2014-04-13 22:52:59 UTC

I am a failure

I am nothing, but a failure. Everything I do will always  end on bad terms. Why do I even think, breathe, live?

  I shouldn’t.

I’m just a waste of energy. This creatures called depression tore apart the life I used to have. Nothing just a dark void feeling the hole the creature had left.

I hate every second of it. Knowing I’m going to always fail in everything I do. I shouldn't even be here talking about it. I should be out there, enjoying a normal like other ponies. No instead I failed.

I failed at having a good and normal life.

I failed.