Melted Snowdrop

by TheSephirothWriter

Rating: everyone
Tags: Sad
Length: 193

We all know Snowdrop is blind.... but she wasn't always like this.

A story about how Snowdrop was born able to see, but because of a pony became blind.

Published 1970-01-01 00:00:00 UTC
Last updated 2014-08-10 17:08:12 UTC

The Birth

Chapter I - The Birth

It was the first day of winter, Snowdrop's parent sitting in their house quietly.

Her dad sat quietly, sipping his coffee quietly.

Her mom did the same, looking slightly uncomfortable after a few minutes of sipping "Honey?..."

He looked up, away from his cup, looking at her "Yes?"

She sighs, getting up slowly "I..." She fell to the ground as her legs failed her "I think she wants to come out..."

He got up, helping her wife up, flying slowly to the hospital, getting lower and lower every second, not being a strong enough stallion to hold the both of them up together.

Fortunately, he was able to bring the both of them to the hospital, opening the doors slowly, the doctors quickly rushing to pick up Snowdrop's mother...

A few hours pass, her husband getting worried, as nurses passed worried, some of them sweating frantically.

Meanwhile, in the other room, the doctor smiled and pulled out Snowdrop, it was beautiful "Congratulations, it's a wonderful baby girl!"

She picked up her wonderful new foal, smiling at her.

This was just the start of Snowdrop's life.