The Lighthouse Horror

by EarthBound Pwny

Rating: everyone
Tags: Dark
Length: 97

A pony enters a lighthouse, and quickly regrets it.

Sea Shanty twirled his keys in his telekinesis, then stuck them in the door. He needed to replace the lighthouse's spark bulb. But when he opened the door…

Published 1970-01-01 00:00:00 UTC
Last updated 2014-11-13 16:43:32 UTC

Chapter

"Winter Wrap-Up, Winter Wrap-Up, I sang. As I passed somepony, I paused to say, Good evening, miss! She smiled, replying, Good evening, Sea Shanty! We then went our ways. I soon reached the Lighthouse of Canterlot. I was its caretaker. Tonight, I needed to replace the spark bulb at the top. It had gone out unexpectedly, though it wasn't that old. Obviously a dud I thought, unlocking the door. I climbed to the lighthouse's top, and saw something horrible. When I reported it, authorities said there wasn't an entry for it...not even the shattered window.