the great war: book? 1

by kjack1111

Rating: everyone
Tags: Alternate Universe
Length: 163

the zalgonians break through. salikons destroyed. what now?

the short description.

Published 1970-01-01 00:00:00 UTC
Last updated 2015-01-10 23:58:48 UTC

breakthrough of the kelos stargate

*sirens*

You MUST NOT let the stargate activate! sir, i AM TRYING, but looks like the stargates hacked! *zalgonian fleet warps through* we. are. SCREWED! not really general, send all dreadnoughts, five, eight, galactic plane. *nuke shock waves* here they go nuking the planet again. stylish though. fire of volleys at the imperial fleet. *explosions* oh god. wall integrity? 50% sir. when did they get to pull of a blow like THAT? i highly think training sir. yah, training has to be- BOOM. oh my god. 1% sir. they almost got us! *BOOM* oh my GOD! *white*

orbital kelos gate

we have lost. the planets detonating of, our ships are depleted. whens that shockwave about to hit us? about now sir. now? how fast is that tra-

*white*

*picture to be added*

what Do YOU MEAN we lost the planet! sir, the planet detonated. it was our only defence. *transmisions activate* DESTROOOOYYYYYYY! oh. you again supreme zalgonian.