Black Out

by Gloria Beezus Rose

Rating: everyone
Tags: Tragedy, Adventure, Sad, Dark
Length: 7

Black Outs, what are they, what do they do, why do they happen, why me?

Black Outs, what are they, what do they do, why do they happen, why me? Why me!?

Published 1970-01-01 00:00:00 UTC
Last updated 2015-04-02 03:35:49 UTC

Blackout

My name is Princess Twilight