Exhausted

by Movie Reel

Rating: everyone
Tags: Sad, Drama
Length: 126

I'm so tired.

Some days you just feel tired.

Published 1970-01-01 00:00:00 UTC
Last updated 2015-06-22 03:56:41 UTC

A Short Break

After a long week of damage control and keeping things nice, Celestia asks Raven to leave some time open.

She goes to a secluded area. Takes off her regalia and just rests.

She laments her struggles over the decades and allows herself some time to nap.

She knows it won't last long but she knows resting is better for her.

A member of her personal guard finds her to bring her back to the castle. He is surprised to find her in her state.

With the grace and maturity she's had to display, she redresses and follows him.

She reaches young Twilight's room.

At last the guard asks, "Did you- er... enjoy your break, your majesty?"

Smile. You're okay. "Yes. I did."