Flee

by sugarush13

Rating: everyone
Tags: Dark, Human
Length: 362

Last night, someone with a family and good grades. This morning, not human and running from the things that want to kill me for reasons I dont know.

Last night, someone with a family and good grades. This morning, not human and running from the things that want to kill me for reasons I dont know. I need to flee the city.

…if only I could.

Published 1970-01-01 00:00:00 UTC
Last updated 2015-06-23 06:10:21 UTC

Trapped

Run.

Don't let them catch you.

Wall.

Walls are hard.

Blood is wet.

Its also red.

All I can see is red.

I'm running again.

The red is gone.

I passed the wall.

My arm hurts.

Fall.

Something sharp is in my arm.

Ow.

Something sharp is in my skull.

I'm running again.

Cornered

I sprinted down the street, bright beams of various colors sprayed the ground around me. Three landed in front of me, golden armor shining the light of the sun into my eyes. I dug my feet hooves forelimbs into the ground in front of the creatures to slow myself and leapt down a side street. No use. Three more stood, wings flared and sharp looking spears pointed my way. "Whheheeeee" I made a squealing sound, kicking dust up as I tried to turn around as fast as I could. More dirt was flung into the air in the sudden stop as I realized I was surrounded. Three of them on my front and back, and walls to the side.

Looking up, I studied the walls on my sides. They weren't that tall. I smirked as I remembered moves you often saw in movies, and/or Mario. I hopped up onto one wall, and pushed off toward the opposite. I had an image, of me climbing my way to the top like a boss. As I reached for the other wall, I heard a shout and one of them tackling me and pulling me out of the air. From the ground, I looked up at an angry white face. "You're coming with me," It said.

"Oh come on!" I said with annoyance. one second later I was hit with one of their beams, instantly putting me to sleep.

I was pacing the cell I'd been placed in. Solid stone walls surrounded me on three sides, and thick steel bars covered the last side.  Everything was coated in thick dust, a sign that the cage was rarely used. I'd woken up around two hours ago. Seeing as I hadn't managed to do anything different this time, the guards should come back with the pretty pink princess in around