Pinkie Pie Vs Sleepy Animator

by Llamashy

Rating: everyone
Tags: Comedy, Random
Length: 225

When the Animator falls asleep, Pinkie Pie Gets stuck.

After a long day of Animation for Seasaon 3, an animator falls asleep while working overtime. Usally the cation stops, but Pinkie can't be switched on and off. This is tthe story of Pinkie Breaking the Forth wall. Again.

Published 1970-01-01 00:00:00 UTC
Last updated 2012-06-03 16:21:38 UTC

WAKE UP!

"Ok, bye Twi!!"I yell as she leaves. I begin to walk up the stairs when all the sudden --THUD-- "Wha?" I say whhile ruubbing my mildly confuzeled head.  I put my hoof on the place I hit, it seemed to be an invisable wall. Theen a loud snore echoed from the ceiling of Sugar Cube Corner. "Ohhhh!" My enlightend self exclaimed, "The animator must be working overttime and fell asleep!" 'So what do I do now?' I thaught, 'Maybe the other ponies will know!' I rush to the door and try to open it.  The door knoob wouldn't budge. 'Hmm... Maybe the window!' I run over to the window annd try to pry open, no luck.. I zip over to every window I could, none of them worked. 'Come on Pinkie, if you can defy the laws of physics, you can get out of here.' I think.  I ram in the door multiple times, still the door stood tall.  "Rrg, HEY ANIMATOR PERSON WAKE UP!!!"  I scream at the roof. "Well, I'll be here for a while." A few minutes passed, but it felt like hours. I find a piece of paper and a pen, so I begin to write down my  thaughts.  'Day 1, its been five minutes... the animator still ha

Hey, Thanks for reading, This is a small side project. Tell me if you like it!