Bring Me Into The Light

by Silver Pen

Rating: everyone
Tags:
Length: 153

Published 1970-01-01 00:00:00 UTC
Last updated 2015-11-21 01:06:05 UTC

Bring Me Into The Light

            For years I've been in darkness

          For years I have brought pain

           To others who are not to blame

          I am the one to blame

          I am the one who brought

          Chaos,Misery,and Fear

          To the ones who did nothing wrong

          My anger has made you unhappy.....

                My sadness has caused you rage

          I couldn't see why

        I can't see in the dark

        But I could hear your screams

        I could hear your cries

        And it was all because

              Of  Me

       For years I've been in darkness

     No one came to search for me

         To care for me

         To love me

         That is until you came

      No one has ever shown me kindness like you have

       Has ever tried to be my friend

          To care for me

           To love me

      So I thank you

            For finally bringing me into the light