The Day Mr.Splashy Died

by Thorax

Rating: everyone
Tags: Tragedy, Slice of Life, Comedy
Length: 32

The Goldfish was dead all along. (Role of Goldfish was played by Bruce Willis)

Queen Chrysalis the Immortal Queen of the Changelings has never know loss before. However that all changed when her pet Mr.Splashy the goldfish died at the tragically sad age of 252.

Little does she know he had been dead for the last 251 years, she was just a little slow to notice.

Dedicated to a man who lost his Magikarp
He's in a better place my friend, his death brought meaning to your Nuzlocke do not let it be in vein.

Published 1970-01-01 00:00:00 UTC
Last updated 2016-02-15 23:12:37 UTC

Too Young

The Best Kept Changeling Secret

Of Necromancy and Goldfish

Night of the Living Goldfish

An End Unto All Things

Ever Turning Wheel (Of Goldfish)