24 hours

by mr xlu

Rating: teen
Tags: Dark, Sad
Length: 78

I thught it was a joke then

Published 1970-01-01 00:00:00 UTC
Last updated 2016-03-26 18:59:44 UTC

The last day

My final day was a sunny one, I wished it was dark and rainy I didn't really believe her at first, but that's my falter I guess, well ill tell you my tale.

hour1

"Your gonna die today enjoy  it wall it lasts.''

I awoke with start making my sister shake in her sleep I was mad at the time I should of hugged her. She began to slowly open her eyes

"Hay brother ha