Steam Heart and the shower hose

by CreepyQuill

Rating: mature
Tags: Sex, Random, Original Character, My Little Pony: Friendship is Magic
Length: 1961

After a long day of work, Steam Heart decides to try out a fantasy he has been thinking about for a long time... (Inflation clop)

Steam Heart has always loved big bellies, the way they looked, jiggled and how soft they were. He had however never tried having a big belly himself, though with a bit of self-persuasion he decided to live the fantasy...
With his shower hose.

Warning: This is an inflation clopfic! You have been warned.

Published 2017-12-09 01:20:07 UTC
Last updated 2017-12-09 01:20:07 UTC

In which fantasies are brought to reality

Author's Note

First clopfic ever, if you press dislike please comment why so I can improve later stories.

In which fantasies are brought to reality

After a long day of exhausting work at the mechanic's shop, the Las Pegasus native slumped down into his couch. The mechanic's apprentice removed his name tag, Steam Heart, and placed it on the coffee table before him. Steam then proceeded to remove the apron and sling it next to him, not caring that the oil stains might rub off on the blue couch. The stains on his coat were nearly invisible against his copper fur. Sighing he rubbed the base of his horn and was thankful that it was finally Friday, the black locks of his mane caressed his fetlock. Since it now was the weekend, he had time to do some certain… activities.
Steam Heart had a certain interest in, more sizable bodies. He wasn’t interested in ponies twice his height or something like that. He just liked the look of ponies who might have a little extra around the waist.
He first discovered this in his early pubescent years, when his teacher became pregnant. He used to pleasure himself to the picture of her big round belly. This peculiar interest soon started to develop and spread, now it wasn’t just his teacher, other pregnant mares, overweight ponies. Mares as well as stallions. Steam Heart simply loved the way their bellies looked, he couldn’t really explain why.

As he thought back to the young mare he saw earlier today he smiled, she was plump all the right places and it was clear she had just had an enormous meal, her stomach had been bulging out and looked a bit disproportionate to the rest of her body. He imagined the mare on her back, spread eagle, with an even bigger belly. Steam’s black stallionhood were slowly unsheathing at the image and he softly moaned.

“I need a shower.” The unicorn mumbled to himself and rose up from his seat. On his way to the bathroom, he grabbed a black towel from the hallway closet. He walked into his bathroom and closed the door, his member still unsheathed. He threw the towel next to the bathtub and used his magic to turn on the shower head. While waiting for the water to warm up, Steam Heart started to rub his soft cock with his magic, moaning quietly. As his rod started to get hard, steam started to form and the unicorn stepped inside and let the hot water wash over his back. Steam Heart sat down on his haunches and grabbed the shampoo bottle off the shelf and slowly massaged it in his scalp when the soap suds covered every strand he used a single hoof to give his tail the same treatment. All the while softly caressing his cock with his magic, he sighed in delight as a few warm drops of water landed the right on his tip.

Steam started thinking about the mare again, he wished he could have touched that belly, feel the soft fur and really grope the area. He didn’t even need to see her fully naked, just the stomach was a turn on enough.
When all the shampoo had been washed out, Steam Heart let go of his member and used his magic to rub his legs and torso with the bar of soap, once all of his coat had been rinsed he turned his face to the shower head and let the water stream down his face, neck, chest, belly and last his now rockhard stallionhood. He started examining the shower head with his eyes, he started to wonder. Could you perhaps get big with it? He had heard of ponies using a pump to get inflated, and sometimes water enemas… He then started to wonder how it would feel to be inflated. Unconsciously he rubbed his slim stomach, the thought of being full like that made his cock twitch. He had bottomed with a few stallions before and he loved that, but being full of cock might just have been a bit different than being full of water.

Before long he made up his mind, he turned the shower off and stepped out of the tub, nervously biting his lip. He had never inflated before, he had tried to swallow air, but that had been unsuccessful. Steam Heart quickly trotted to his bedroom, still dripping water everywhere. He grabbed a clear plastic bottle by his nightstand with his magic and trotted even quicker back to the bathroom. Steam placed the bottle of lube next to the shampoo on the shelf and used his magic to unscrew the shower head from the hose. He chuckled nervously and placed the head on the counter on the other side of the room. He let the hose fall to the floor while he prepared himself. Using his magic, he started to slowly massage his back entrance, moaning at the stimulation. Steam’s cock twitched as little electric ripples went up through his spine. The little ball of magic started to prod his hole, while still massaging the ring. A little amount seeped in and started to stretch the ring ever so slightly, it made Steam Heart erupt in an effeminate gasp. He used his right hoof to rub his cock, the double stimulation felt amazing and he closed his eyes as he pleasured himself for a couple of minutes.

As precum started to leak Steam Heart finally let go of his rod and stopped prodding his own ass, he grabbed the bottle of lube in his magic and uncorked it with his teeth. He spat the cork out and started to slowly pour the lube on his butt cheeks, he gasped as the cold liquid hit him and his haunch tensed up a bit. When he had poured enough he placed the bottle on the floor next to him and then used a hoof to massage the lube in and around his hole, if the hose was going to go in then he had to be as slick as possible.
When he deemed himself lubricated enough he turned his back to the shower hose, grabbed it with his magic and lined it up with his entrance. He gulped and whispered “This is a horrible idea..” to himself, yet he wanted to do it anyway. The thought of being so full and big was way more intoxicating than it was fear-inducing. Steam brought the tip of the hose right to his ring and gasped lightly as the cold metal touched him. He closed his eyes and tried to relax his muscle as much as possible. He started to slowly push the hose, trying to get it in at an angle so that the edges wouldn’t hurt him, it proved more of a challenge than he originally thought. He started to push the hose harder and it finally went in, Steam moaned as his tunnel engulfed the cold metal and he wiggled his hindquarters trying to adjust to the feeling. He pushed it in just a few inches and left it there as he started to rub his cock again, the intrusion had made it leak more droplets of precum from the tip. He used the precum to make his cock slicker as he stroked himself, moaning from the feeling.

Steam decided that he had stalled enough and grabbed the knob with his magic, turning it ever so slightly so only a trickle exited the hose. He felt the cold water immediately, it felt strange, but not in a bad way. He turned the other knob so that the water would remain cold, he liked that better. He slowly fapped with his magic as more water started to fill him, he still couldn’t feel a big difference, just a little pleasurable trickle in his tunnel. He blushed and chuckled a bit, “This is ridiculous.” Steam Heart said and turned the knob to let just a little more water out. He felt the shift immediately and moaned as he felt the cold water filling him, there was still no difference in the way he looked but the slight pressure in his belly felt amazing! He was now leaking pre-cum continuously and he had to focus on not to rub himself too fast. Short electric spurts went up and down his spine, as the pressure grew, he started to moan every few seconds had his pleasure increased as well. Steam loved the way large bellies looked, but this was on a whole other level! He started to move the hose about an inch out, then an inch in, he continued to fuck himself with it for a while, stroking himself a bit harder now while his black swollen balls swung lightly like pendulums.

Steam Heart closed his eyes while he felt the pressure increase more and more, he brought his hoof to his belly as he felt it slowly bulging out, he moaned and rubbed the spot more. Using his magic, Steam formed a shape resembling a pony cock around the hose, he started to fuck himself harder with it, moaning loudly and effeminately each time he thrust in while still using magic to stroke his cock. When he opened his eyes he looked down and saw that his belly had bulged out by at least four inches, he giggled and thrust harder with the magic. He spread his legs allowing the magic cock to thrust deeper. The pressure from the water only build up more and more, as his belly grew another two inches Steam Heart felt the familiar pressure in his balls. Steam was basically yelling now as the magic cock thrust hard enough to move his entire body. The water was still endlessly pumping, inflating Steam more and more, he felt the cool water slosh around inside him and he loved every second of it. The way he looked, the pressure in his belly made him feel, it was the most amazing thing he had ever felt.

The cock went in as deep as possible and Steam Heart turned the knob, increasing the water flow. He yelled in pleasure and stroked himself one final time as his balls tensed up. His orgasm went on for minutes, even after he had stopped releasing cum the feeling was mind-numbingly good. He softly stroked himself very lightly as he went limp and his member retracted into its sheath. He turned the knob, stopping the water flow and removed the hose from his rear. A little water splashed out as he realised just how big he had gotten. As he stepped out of the tub his belly touched the edge, he looked at himself in the mirror. He looked almost pregnant! He almost became hard again looking at himself like that, but he went into the tub again. He used his magic to open his ring ever so slightly. The now luke-warm water trickled down his legs and ball sack, he shivered at the feeling and opened his hole a little more. Water now flowed out more rapidly and Steam Heart felt his belly slowly shrinking and the pressure started to ease. He moaned at the discomfort of his hole being opened like that for so long, but the water had to go out.
As the last of the water trickled out, Steam Heart corked the lube bottle, dried himself off completely and screwed the shower head back on. He decided to clean up properly later, he was too exhausted now.

He threw himself on the couch once again, now smiling contently. He grabbed the folded blanket by the armrest and covered himself. He didn’t resist when his eyes shut and he fell asleep.