The Shortest MLP-FIM Fanfic Story in the World

by DataPacRat

Rating: everyone
Tags: Dark, Alternate Universe, Sad
Length: 14

It's the shortest MLP-FIM fanfic story in the world.

It's the shortest MLP-FIM fanfic story in the world. This description is longer than the story itself.

Published 1970-01-01 00:00:00 UTC
Last updated 2012-07-21 23:10:04 UTC

Chapter 1

The last pony in Equestria

heard a knock at the door.