Equestria: Total war

by The Cowardly Christian

Rating: teen
Tags: Violence, Princess Celestia, Crossover, Twilight Sparkle, Gore, My Little Pony: Friendship is Magic, Death, Alternate Universe, Main 6, Other, Science Fiction, Horror, Adventure
Length: 0

In a world where a tyrant didn't die and a kingdom didn't fall...a king wished for MORE on his deathbed...and so his kingdom got more! They got the magic of Friendship!...and Nen?

In a world where a tyrant didn't die and a kingdom didn't fall...a king wished for MORE on his deathbed...and so his kingdom got more! They got the magic of Friendship!...and Nen? The time is now Sons of Rome! Daughters of Equestria! Veni, vidi, vici!. Total war and Hunter X Hunter crossover!

Published 2018-07-09 11:00:08 UTC
Last updated 2018-07-09 11:00:08 UTC

Chapter 1

Something has gone wrong. We don't seem to have an archived copy of that chapter.