Spike's Dragon Wafius

by Mister Phoenix

Rating: mature
Tags: Smolder, Sex, Ember, My Little Pony: Friendship is Magic, Porn, Spike
Length: 2303

Smolder brings Ember to the session that she has with Spike.

Spike and Smolder are now Friends with Benefits, normally fucking each other after school is over or in the weekends. One day Smolder brings Ember into the fun.

Stories in order:
Cobra Bite
Spike's Dragon Wafius
Very Sweet and Quite Smoky
Spike's School Daze

Published 2018-10-03 21:50:01 UTC
Last updated 2018-10-03 21:50:01 UTC

Two For The Price of One

It was an early morning, on a late summer day. It has been an odd couple of weeks for Spike the Dragon, ever since he got bitten by a cobra. Since then he and Smolder had a strange relationship, with zero romance between the two dragons and there's the fact that she sucks his dicks almost every day.

Smolder normally wanted Spike's tangy cum around midday, a little before lunch. So, she could put Spike's cum in her food or make the cum her drink for lunch. Sometimes more than once a day, one in the midday and one when school ended where ponies and creatures alike were enjoying the fresh Ponyville air.

Smolder was on her knees, sucking whatever cock she didn't have at lunch.

Spike didn't even know how he felt about Smolder since the two started banging each other, Spike started to grow a little, he was almost reaching Smolder's height. Whenever Spike tries and talk about his feeling with Smolder, she always just laughs at him and it normally ends with the two of them banging.

"We're just friends with benefits. Don't try and mess that up and fuck me." Smolder said, during one of their sessions.

Spike didn't reply, he grabbed a hold of her hips before the male dragon gave a hard thrust pushing his upper cock deep inside her tight pussy. Smolder scream out in hysteria feeling his large length reaching through her pussy, Smolder lean her head back, a mighty roar escape her lips.

Spike felt her pussy tighten around his cock. He felt her warm dragon cum rushing against his cock, Smolder's claws gripped his back, she wrapped her legs around his waist, pulling him closer.

"Yes, Spike. More, more! Breed me, breed your first slut!" Smolder cried out

Spike's greed or lust, he wasn't too sure which one it was anymore. Began to kick in, holding Smolder down, while he gave powerful thrust after powerful thrust. His cock hitting her womb, her cries of pleasure were a little too loud. Spike quickly pressed his lips against her's.

Smolder's eyes widen in surprise. Her yells of pleasure were silence, while Spike banged her harder against the teacher's desk in the classroom that the two of them was meant to be cleaning up. Smolder tried to pull away from the wet, sloppy, but somehow it right in a strange way.

Spike kept his thrusts and he pulled Smolder closed, while he cummed inside her awaiting womb. He broke the kiss that he shared with the female dragon, pulling his limp upper cock out of pussy. Smolder gave him a hard punch in the arm.

"Jerk. You know the rules; one, no kissing, two, no saying 'I love you' after sex, and three, tell no one about this!" Smolder said, showing the numbers with her fingers.

"Sorry, but you get rather loud when we... Fuck each other. Twilight and Starlight still might be around after school." Spike explained.

Smolder looked away, she folded her arms, lifting up her C-Cup breast. "Fine, is there a better place to have our weekly fuck sessions?" She asked

"Possible The Castle of Friendship, the thing is so darn big, that we could have sex any room and Twilight or Starlight wouldn't be able to hear us," Spike said, Smolder tapped her chin in thought.

"Yeah, it could work. See ya next week big boy. Remember to give me the ride of my life." Smolder said, sending him a slutty wink.

Spike was able to rest for the weekend. He was surprised that he could still get hard, but Smolder did say that his double cocks mean that he would build a harem to be satisfied. Heck, he even tired Smolder down sometimes. Once Monday rolled around, it was Spike who took Smolder away in the middle of class.

Her friends were confused but didn't question anything out loud. Spike just said that he 'needed' Smolder's help.

Her lips wrapped around his lower cock, while her claw gripped his upper one, jerking that cock, while Spike's cock hit the back of her throat. Her tongue moved against the shaft, Spike's tongue hanging out his mouth. Enjoying the pleasure that the female dragon was giving him.

Smolder felt his warm cum rushing down her throat, she swallowed every single drop, that flooded her mouth. Smolder let go of his lower cock, licking the tip, so she wouldn't miss a single drop.

Smolder removed her claw from his upper cock, she pushed Spike to the hard ground. Lining up his cock to her wet pussy, she felt his large, thick cock entering into her tight pussy.

Smolder bit her bottom lip, to stop her moans, the pleasure that rushed through her body as she bounces on Spike's cock, with her claws squeezing her breasts. Spike held her hips, he thrusts meet her bounces, the tip of his cock touching her womb.

"Take my cum, Smolder! I'm going to make you my pregnant bitch!" Spike said, the lust taking over his mind.

"Yes, Spike! Cum, fucking fill my womb with your cum!" Smolder yelled out.

Spike let out a quiet roar, filling Smolder's vagina with his warm dragon cum. Spike's double cocks were still hard, and cum dripped from Smolder's pussy to cover the closet floor in Spike's cum.

Smolder left Spike in the closet to clean up the mess that the two dragons made. The orange colored dragon began walking to her next class knowing that the last class ended, deep within her own thoughts.

'Spike is getting a little too much for me. I need to find at less someone to be with Spike beside me.'

Smolder felt a painful sting, it hurt her to think of Spike with other girls besides herself. She grew a smirk, a thought coming to her mind.

'I remember that Dragon Lord Ember is needing to find a consort. Smolder rubbed her claws together in thought a devilish plan coming to her head.

Saturday rocked around, Twilight Sparkle got sent on a Friendship mission with Starlight Glimmer and Rainbow Dash. Spike put in charge of watching the Castle until the three friends got back from the problem. He was lying in the throne room, he heard a knocking at the castle doors.

Knowing that Smolder was here for the two of them to fuck each other brains out. When Spike went to open the door, he saw his fuck buddy Smolder next to Dragon Lord Ember. He gave the light blue female dragon a hug, his arms wrapping around her body.

Spike feeling Ember's E-Cup breast pressing against his scales.

"Smolder told me about your double cocks," Ember said in his ear.

His eyes widen in surprised he looked over at Smolder, who had the largest smile on her face, with her arms behind her back.

Ember took his hand, dragging him away. Smolder quickly followed after the two, closing the castle doors and pulling the male dragon to his room.

Ember attacked his lips, her tongue forcing into his mouth, Spike moans in the kiss that he shared with the Dragon Lord. He was kissing Ember, one of the hottest girls that he has ever met, was now on top of him and wanting him to fuck her.

Ember release Spike's lips, she looked at Smolder who was just standing by.

"Let's put on a show for our dragon friend," Ember said Smolder raised her eyebrow.

"What are you, hmm..." Smolder was about to say before Ember placed her lips against the orange dragon.

Smolder slowly closed her eyes, her and the Dragon Lord tongue battle each other, Smolder soon felt Ember's claws rubbing against her own pussy. When Ember broke the kiss with Smolder, she went to her knees and soon Smolder felt Ember's tongue inside her wet pussy.

"OH, Ember!" Smolder cried out in the pleasure that she was feeling.

"Maybe, we shouldn't leave Spike out of this. He is looking rather lonely." Smolder said, through the cute moans that escape her lips.

Ember broke away from Smolder, to push Spike on his back. Smolder sat on his face, her pussy touching his closed mouth, he let out a gasp that filled Smolder's dripping cunt, when he felt Ember's tongue sliding up his lower cock, while Smolder's tongue wrapped around his upper cock.

Spike's tongue dashed inside of Smolder's tight pussy, she let out a moan around Spike's cock, as she tried to take his cock deep down her throat. Spike moaned inside Smolder's cunt, feeling both Ember and Smolder attack both of his cocks at once, Spike never felt this kind of pleasure before.

He moaned, cumming inside the dragon girls mouths. Ember swallowed each drop, licking her lips. It tasted different from other dragons, it wasn't a burning hot flavor, but it was a sour taste that filled her mouth, and Ember loved every drop of it.

"Alright, Spike. Time for the main show. Breed a kid in me." Ember said

Spike gave a weird grin, the lust had already taken over his mind and he wasn't thinking straight anymore, all he wanted to do now is breed the two lovely female dragons that lay in front of him. Smolder was on top of the Dragon Lord, their pussies pressed together.

Spike let out a low growl, he thrusted inside both of them at once, Ember's eyes widen in pleasure and surprise, never feeling something this big inside her before, the thick and long cock, reach deep inside her.

Smolder felt Ember's lips pressing against her once again, Smolder pulled into the kiss that she shared with the Dragon Lord while feeling Spike's cock rushing back and forth in her pussy.

Spike felt each pussy squeezing cocks, the site of the two hot dragons kissing in front of him, while their warm cunts squeeze him, wanting his cum inside, Spike release a roar, cumming deep inside both of the girls. Pulling out, the cum leak out on to the bed, Smolder moved off Ember.

She gave Spike a grin.

"We're not done yet. Big boy." She said, lust filling her voice.

Spike released a sigh, for hours, he fucked Ember, having her on her side, with her leg over his shoulder while he thrust inside her pussy, having her take his cocks down her throat, taking her in the ass and pussy at the same time. While Smolder licked the side of his cock, while he thrust inside the ruler of the Dragons.

Ember tongue would hang out of her mouth with each thrust given to her, Spike lost count on how many times he cummed inside Smolder and Ember. He felt drained for life, finally falling asleep after one final time he cum inside Ember, flooding her womb with his dragon cum.

It would be a while before Smolder or Ember could be able to walk straight.

The next day, Ember was about to take off, before she spotted Smolder covering her mouth, stopping herself from throwing up.

"Are you sick?" The Dragon Lord asked

"A bit, I'm sure it will pass," Smolder said, waving her claw.

"How many times had Spike cum inside you?" The question seemed to come out of nowhere

"Every time we bang, why do you ask?" Smolder wondered.

"Smolder, you're his mate now. Well the first mate, and you're also pregnant. I can't be sure, but seeing how many times he cum inside, and how many times that you two fuck." Ember said Smolder's mouth dropped.

"But, but, but, but..." Smolder repeated, standing in disbelief.

"I know that I am, and it saves me the trouble of marrying some random dragon. Since Spike his the father of my first child, I guess that also makes him King of Dragons. Never really thought about it." Ember said.

Smolder was still couldn't believe it, but it made a lot of sense like why she felt jealous of other girls looking and talking to Spike, the fact that she been feeling sick. She was going to be a mother, and she knew that Spike needs to find at less three more girls to have a complete harem.

"Smolder!" She heard Yona's voice call out.

Smolder turn to see Yona, Silverstream, and Ocellus rushing up to their dragon friend.

"We know about you and Spike, and we want in." Ocellus said in Smolder's ear.

She gave a grin at the girls, "Sure, the more the merrier."

Author's Note

Based on this comic, I found quickly after making this.

So, people seemed to like the last trash story I made called Cobra Bite. It was more liked than Wild Flights, a story that I put thought into. So, that happened. This is also trash, that I most likely made in less than a day with almost no editing.

I was thinking of deleting this, because of the top secret Christmas story that I'm currently writing that may or may not have Spike banging both Ember and Smolder and a couple of other girls :raritywink: :raritywink: :raritywink:. But then I remember that Captain Falcon said I should and he destroyed half the galaxy with a punch.

That and I think I said the same thing twice somewhere, which is Megaman X6 bad, "What Makes You Laugh." - Zero "Zero, its good to see again" - Dr. Light

Let's hit that feature box with a trash story! Yay, here's your Spike and Smolder/Ember story and question time, would anyone like to see a third one with Spike with Smolder, Yona, Silverstream and the Changeling girl, who I can't remember the name of, but will come to me later, and I can't bother looking it up. (She's my Favorite character.)