Fertility Troubles

by blacwido

Rating: mature
Tags: Daisy, My Little Pony: Friendship is Magic, Porn, Fetish
Length: 2326

A mare named Daisy has been having trouble getting pregnant. When her stallion can’t seem to get the job done, she decides on alternatives.

Daisy had been wanting a foal ever since she had gotten into a relationship with a stallion who she loved with all her heart. However, as they constantly tried for a child it just wouldn’t work and Daisy would wait months only to see she still had a small belly. After many failed attempts, Daisy decides to visit what she assumed was a fertility clinic which she had read about in the paper. This turned out to indeed be a fertility clinic, but little did she know this clinic went above and beyond to make sure they were successful in getting seemingly infertile mares a child they desire.

This clopfic contains: Daisy going through a few artificial insemination procedures, very quick gynecology, and heart warming successful news at the second chapter.

Can’t name who the picture belongs to as I had this picture saved in my photos for about a year. To whom ever it belongs to, credit goes out to them.

Published 2021-03-14 14:20:01 UTC
Last updated 2021-03-14 14:20:01 UTC

The procedures

After kissing her boyfriend goodbye Daisy trotted to the fetrility clinic she read in the paper yesterday.

You see, Daisy and her boyfriend had been trying to have a foal to no avail. They were always on time during heat season, they checked with the doctors every time they had attempted conception, but nothing seems to have worked.

This clinic seemed to be Daisy’s only hope, and she prayed to Celestia that these procedures will work.

She contemplated on what procedures they would be doing. Sure she knew she was going to have sperm put into her, in the paper it stated that they got generous donations from stallions with very high fertility levels.

But what do they mean by procedures? Will she have to visit there every day? She was about to find out as she had finally made it to the front door of the place.

In front of the door was a mare dressed in the typical nurse uniform that she assumed she’d be seeing all day in there. She walked over to Daisy and showed a clipboard with a bunch of other mares names, Daisy pointed to her name and the mare nodded.

Daisy then walked through the front door and the door shut behind her. As she attempted to walk to where she guessed was a front desk she immediately saw about 2 doctors and a nurse walk over to her, one of the doctors was holding what looked like a turkey baster and a small capsule.

Daisy stood there bewildered as to why they were all here and not in a room, when she felt her tail get raised by the nurse.

She noticed the nurse inspecting her pussy as she spread Daisy’s lips open. Daisy started to flood her head with questions. “Why were they doing it here?” “Why not go into a room for this?” “I hope no one sees this happening, this is in public!”

Daisy then saw one of the doctors put the turkey baster looking tube into the capsule and pull the mechanism back, she saw it turn white and instantly knew that it was sperm being collected.

As she was about to ask them all the questions she had in her head, the doctor holding the turkey baster look alike walked behind her. She panted as she felt something push into her pussy and then penetrate her.

She was used to this as she and her boyfriend would normally rut, they did so for months to try and get her pregnant after all. But this was different, it felt cold as she felt it push into her insides creeping towards her womb. Daisy winced in response to the coldness as she then felt it finally meet it’s destination.

She then saw the doctor and mare still in her view nod to the doctor behind them and she felt it, cold sperm started to pour into her womb. She just stared at the doctor and nurse as she felt every bit of sperm cascade into her. Finally the feeling stopped as she then felt the tool exit her pussy, leaving her feeling empty.

Daisy assumed that maybe they were in a hurry and that was it, so she thanked them and went to leave only to be stopped by the nurse. She had blocked Daisy’s pathway towards the door and pointed her hoof in the opposite direction of the door, instructing Daisy to follow the 2 doctors.

Daisy, now completely confused did as she asked and followed them into a room. She looked into the room to see a hospital bed to the left with a dresser on the right.

The doctors and nurse walked past her and put on a pair of gloves, then motioned for her to sit down. Daisy did as they asked and sat down on her back.

The nurse then walked in front of the bed where daisy’s legs were and spread them wide, giving her a clear view of her pussy.

Daisy even though she had fully prepared herself for them to see her pussy for most of these.... procedures, she still blushed at seeing the nurse stare at her insides as she spread her lips apart with her hooves. The doctor seemed to be inspecting her insides, making sure everything was as it should be Daisy assumed.

As she would spread them a little trickle of the sperm that was just poured into her earlier would come out. The nurse then nodded to the other doctors and one of them then digs into the dresser, pulling out something that made Daisy a little nervous.

What the doctor pulled out was a long plastic tube that looked like it was used for a fish tank. The doctor walked over to Daisy and began shoving the plastic tube in without warning, causing Daisy to yelp from having the cold and thick tool being pushed into her depths. He would occasionally look at Daisy’s eyes, making sure he wasn’t hurting her or pushing too hard.

After 3 seconds of shoves from the doctor half of the plastic tube had fully went inside. Daisy felt her pussy throb in response to being stretched so wide, she wasn’t going to admit this to any of the doctors but she was starting to feel aroused by this.

Daisy sat there as she saw the doctor on the right then pass the tube to the doctor on the left, who then bent down and connected the tube to a machine. Daisy looked down and noticed it. She also saw that in the middle of the machine was a plastic container connected to it, with at least a gallon of sperm inside of it.

Realizing what she was about to go through, Daisy could only watch as she saw the doctor press a button and tons of sperm started to work it’s way up the tube. Daisy started to get nervous again, was she really gonna be able to take all of that sperm at once? Surely her uterus wasn’t that large.

As she thought this she snapped her attention back to the tube to see that sperm was now making it’s way inside, flowing through the amount of tube that was pushed into her. The sperm was now inside of her but she didn’t feel it pour into her yet, it still had more tubing to flow through before reaching her womb. She felt the sperm go through the tube as it flowed causing her inner walls to split open more.

Seconds came by before she then felt the cold fluid finally reach to the end of the tube. Her eyes went slightly wide as she felt the torrent of fertile stallion sperm start to fill her uterus with every passing second, she felt like a turkey being stuffed. She looked down to see large amounts of sperm flowing through the tube and into her pussy.

Daisy began to lightly gasp as she felt the cold baby batter gush into her, her pussy hugging the plastic tube trying to milk it. She looked over to the doctors for a second to see them waiting patiently around her.

Another 10 seconds and her uterus could no longer hold in any more sperm as it started to pour out of her pussy at a rapid rate. Daisy looked at the doctors as one of them trotted over to turn the machine off, she looked at the machine again and saw the plastic container was now half empty.

Then the nurse pulled out the plastic tube slowly, Daisy couldn’t help but moan a little bit at the sensation. Once she felt the whole tube exit her she immediately looked down to see jets of sperm leak out of both the tube, and her pussy which was currently making a mess below her.

Daisy, now feeling quite full again thanked them and went to get up only for the nurse to stop her before she could. She then pulled out her face mask and insured Daisy that they have only one more procedure to do.

Daisy wasn’t completely for it, but she decided that she needed to try and conceive by any means necessary. So she nodded to the nurse and stayed in the hospital bed. The nurse and 2 doctors then left the room.

2 minutes went by until Daisy heard 1 doctor enter the room, carrying what looked like a hot glue gun. Wait no, that was exactly what it was! She immediately started to panic as she thought about being burned from the inside, She went to get up and leave when the doctor trotted over quickly.

He pointed to the side of the glue gun to show her what option it was set on, “Warm”. She then felt herself relax relieved that the glue gun had a warm option, and that she wasn’t gonna have her insides have second degree burns.

The doctor then walked over to daisy’s right, putting on more gloves. He had also put down a capsule that he had in his right hand onto the dresser.

Daisy looked at all those sperm cells swirl around inside such a tiny contraption. Daisy then started to feel.... more aroused at the thought of all that warm sperm being shot into her. She felt her pussy quiver and start to get wet as the doctor then walked to the front of the bed.

He took the cap off of the back of the hot glue gun and poured all of the sperm from the container into it. Daisy watched as the doctor turned the glue gun on and held it, waiting for it to heat up.

Minutes went by and the doctor then hoisted the glue gun up and positioned it in between her legs, Daisy trying to hide her excitement as he spread her lips open about to push it in. These 2 about to be 3 times of her uterus being filled, made Daisy feel like this is gonna be a new fetish she’s gonna like fantasizing about.

The doctor then stopped for a moment and Daisy frowned, making her worry that maybe she was already too full to continue. He had a clear view into her now fully gaped pussy after all, and she can actually feel all of the sperm moving inside of her as she shifted.

That worry went away however as the doctor reached behind him and attached a smaller version of the plastic tube from earlier onto the front of the nozzle. Daisy then felt a plastic tube get pushed into her insides once again.

Daisy started to squirm and silently moan as the tube went into her inch by inch, until it finally stopped and reached her womb.

Without anymore wait, the doctor squeezed the trigger on the glue gun and out came warm sperm coming down the tube, approaching Daisy’s aching canal.

Unlike the other 2 times when her uterus was being fed uncomfortably cold sperm, Daisy was actually excited to feel this warm nectar swim through her insides and get trapped into her womb.

That wait was about to be short lived as she felt the warm sperm finally enter the tubing that was inside of her. The hot substance making her feel pleasantly warm and aroused inside her pussy as it slowly approached it’s goal.

Seconds felt like hours as Daisy impatiently awaited the hot spunk to enter her, until finally it happened. She felt every drop of hot sperm enter her uterus as her pussy instinctively grasped the plastic tube, hugging it so it wouldn’t go anywhere.

Daisy was in too much of a daze to realize she was making really lewd faces, causing the doctor to chuckle a little as the very last amount of stallion cum dripped into her.

Daisy could feel the hot stuff swim around in her womb as it heated up the cold sperm that was placed in her just minutes ago.

The doctor pulled out the small tube and told Daisy that she was all set, and to write them a letter some time to tell them if their methods worked.

Daisy nodded before getting out of the hospital bed about to walk out and leave. Before she could however the doctor asked her to wait just a moment as he then placed a large bandaid on her pussy, encasing any sperm and preventing any of it from leaving.

Daisy, seeing what he did thanked him and and walked out of the room, and then out of the front door completely confident she’ll finally conceive.

The success letter/Epilogue

Prologue

Months have went by since Daisy visited the clinic she went to to try and conceive a foal. She was willing to attempt anything for herself, and the love of her life who she had at home. Daisy was happy to see that the procedures actually worked as she looked down to see her big belly proudly swaying as she trotted towards her desk.

She had remembered one of the doctors asking her to right them a letter confirming if the procedures they had preformed on her were successful. Today she writes that letter telling them the good news.

The letter

“To the doctors and Nurse that did the procedures on me at the fertility clinic a couple blocks down from where I live, you guys are amazing! I am happy to tell you all that I am having triplets, 1 boy and 2 girls to be exact. You 3 are all invited for when the baby’s are birthed, and for when I have my baby showers. Thank you all for making not 1 but 3 dreams come true for me, I hope you can make mares before me as happy as I am right now. I hope you all have a good day today and I can’t honestly thank you enough.

-Daisy