Fluttershy Wants Attention

by The Irish Brony

Rating: mature
Tags: Romance, Fluttershy, Sex, Profanity, Human, Original Character, Porn, My Little Pony: Friendship is Magic
Length: 1469

Brogan comes home from work when he get's a surprise from his mare Fluttershy

Brogan comes home from work when he get's a surprise from his mare Fluttershy with sex.

Published 2022-02-21 00:40:00 UTC
Last updated 2022-02-21 00:40:00 UTC

Fluttershy Wants Attention

I walk up to the cottage and knock on the door before saying, "I'm home!" I then turned the knob to find out the door was locked. "Fluttershy?!" I yell, concerningly. "The door is locked!"

"Oh! Sorry," Fluttershy says from inside. I hear shuffling before the door clicks. I turn the knob but I am interrupted by Fluttershy. "Hold on, don't open the door yet." I'm slightly confused, but keep the door closed as I hear her move around inside. After a few seconds, I hear her sweet voice coming from the living room. "Ok, come in,"

I sigh as I step into the cottage. I slid my backpack off as I start to rant. "Fluttershy, you would not believe the day I just had. First I was attacked by flying filly trying to get their trebuchet cutie mark with the CMC then.." I stopped as I turns to look at Fluttershy.

Now normally she was cute in her own way, but dam did she take it up a notch. She stands with her rump facing me and her head turned towards me. She has a small smile with her entire face also being beat red. Her long back hair was tied up into a ponytail while her bangs were combed straight down. Her bright yellow fur now glowing in the summer sun from the light coming from the windows. What really caught me off guard was the purple striped socks that she wears on her hind legs. They accentuate her already plump rump even more. They cling tight to her skin, almost squeezing her.

I stand there speechless as I drop my bag to the floor in utter shock. I trail over her body a few more times to make sure I was seeing things right. Her smile fades to worry as she turns around and flies over to me. "Brogan, are you ok?" She asks, waving a hoof in front of my face. I turn to look at her in her beautiful light blue eyes.

I crack a small smile before responding with, "I'm more then fine when I'm with you." She blushes as I place a hand on her cheek. "You didn't need to do this,"

"I thought with all the pressure you've been under from working with Twilight.. I just thought you could use some.. relief." Fluttershy lands on the ground as she seemingly shrinks smaller trying to hide her face. I squat down and lift her face to look at me.

"You can just ask, sometimes we both need to just unwind," I say before kissing her. She flinches from the sudden touch before melting into the kiss. Her soft lips brush against mine as my heart skyrockets. One hand rubs her cheeks as the other drifts down her neck and to the bass of her wings. I slowly start to massage the base of the wing as they extend out. Fluttershy moans into my mouth, pushing harder into me.

I pinch the base of the wing and start rubbing up and down the shaft, getting happy little moans out of her. her wings now stiff as a frying pan. I was getting into a rhythm before she pulls away from me. Her warm lips leave mine as the cold rushes in to fill the void she left. Before I can ask, she surprisingly pushes me down to the ground pretty hard. She stands on top of me with the most determined smile I have ever seen on her.

"I said I was going to relieve stress from you and you're going to like it..." She trails off as she struggles to get my pants off. She finally slides them and my underwear off. My hard dick hit the cold air, causing me to shiver. Fluttershy sits down on my chest as she examines my dick. I wonder what she's waiting for before the most wonderful sensation I have ever felt before hit's my dick. It was soft like silk and gently but rhythmically rubs up and down my dick. I crane my neck to see one of her wings was indeed jerking me off. She speeds up a little as I let out a moan, pushing my hips up towards her.

"You like it?" Fluttershy asks sheepishly.

"Fuck," I say in pleaser before responding correctly. "Yes, it feels great." I hear her chuckle cutely as she continues to rub her wing against my dick. The pleaser of her soft wing sliding against my skin is getting to be too much, but before I can even say anything she slows to a stop. I grunt in disapproval as Fluttershy brushes her wing against my inner thigh. I take a deep, sharp breath in as my body shoots with pleaser. She places her warm mouth on the tip of my dick and licks it. Her wings sliding against the inside of my thighs.

The pleaser was amazing, nothing I have ever felt before. It felt like lightning shooting up my back. I wanted to thrust my hips into her mouth so bad. That's when in my pleaser high state, I notes my chest getting wet. I look down to see Fluttershy grinding against my chest.

"If you're going to tease me, then so be it," I think before grabbing her plump rump. She squecks from the touch. She pulls off my dick, but before she can say anything, I pull her rump towards my face and take a big lick against her dripping slit. She shivers in pleaser, now face down in my croutch. her cum tastes bitter and sweet at the same time. Fluttershy takes a hoof and rubs my dick while licking the entirety of my shaft.

I massage her rump, digging my fingers into her plush rump. Her soft rump pushed against my fingers. This gets me happy moans from Fluttershy. I lick the area around her slit. This causes her to grunt in pleaser and anger. I chuckle as I keep massaging her rump as I slide my tongue into her. She lets out a high squeaky moan as I push my tongue against the inside of her. I continue my massaging of her rump and sliding my tongue against her insides.

"Brogan I'm!" Fluttershy was cut off by her own pleaser moans as she thrusts her rump into my face. Cum spilling all over my face as she spasms. Her hoof falls of my dick as she slowly stops thrusting into my face. I pull my face away from her rump and the two of us lay there. She smiles like a goofball as I slowly massage her rump. She lets out a happy sigh as she rubs her cheek against my dick.

"Fluttershy," I say cailmly and sweetly. Fluttershy looks back at me with a small smile and tieard eyes.

"Ya?" Fluttershy asks.

"Would it be ok if I use you to realece some stress?" Fluttershy nods yes before I sit up and grab her torso. I stand up, causing her to let out a meep sound from her mouth as I walk over to the couch. I place her down on the couch with her butt off the edge of the couch. I stand behind her, placing my dick on top of her rump and slowly rubbing it against her soft behind. She lets out a sigh as I sqush her rump together and massage her cutie mark.

"Inside please?!" Fluttershy moans and begs.

I crack a smile before speaking, "Sure thing Flutter's." I pull back and lines up my dick with her dripping slit. I slide it in, cuaing her to let out a happy moan as my dick pushes against her insides. Her walls clamping down on my dick. Waves of pleaser and warmth overwhelm my body as I solely push deeper into her. I slowly make my way into her until my hips hit her plush rump. She shakes and moans in pleaser, her hips thrusting back into me.

I pull out and massage her rump before thrusting fast and gently into her. She lets out a high pitched moan as I pull out again. I thrust fast in and pull out, with every thrust she moans in pliss as her slit starts to leak cum again. The very familuer sensation starts to build up inside me again.

"I'm cumming!" I yell as I thrust into her. She lets out a loud moan as I grunt. My cum filling her insides. I give little thrusts into her rump as her slit milks me of all my cum. It finally stops and I pull out. I sit down next to her and pet her head. She cralls onto my lap and starts puring happily. We lay there, content with each others presence.