Darkness is really upon us.

by MagicalPony2099

Rating: mature
Tags: Violence, Crossover, Sex, Dragon Ball Z, Spitfire, Crystal Ponies, Anthro, Profanity, Radiant Hope, Gore, Slice of Life, My Little Pony: Friendship is Magic, Dark, Death, Alternate Universe, Human, Porn, Naruto, Fetish, King Sombra, Self Insert, Non-consensual
Length: 0

A Displaced Story. Willight turns into King Sombra during his reign in the Crystal Empire.

This story is inspired by Flyingninjafish's Darkness not really upon us. story. This story isn't a sequel to that story, but more of a stand alone kind of story.

Instead of Will as the main protagonist, its Willight Robinbine.

3rd POV Self-Insert.

Willight was at ComicCon for the year 2029. He went as just himself, not wearing any costumes for that con, but he was wearing his bag that has his stuff including his laptop in it. Then he spot The Merchant and bought King Sombra's crown and got sent to an Anthro Equestria in the past during Sombra's reign for the Crystal Empire as the king himself. At least he got to keep his hands.

Contains: Gay Sex, Anal, Rape, Vaginal, Oral, Deep Throat, BDSM, Handjob, Brainwashing, Magicjob, S&M, Whipping, Slapping, Biting, Public Nudity, Cock and Ball Worship, Impregnation, Forced Estrus, Asphixiation, Slavery, CBT, Ball Busting, Gelding, Watersports, Golden Shower, Masturbation, Cum Inflation, Urethral Penetration, Ball Inflation, Bladder Inflation, Urine Inflation, Cock Docking, Urine In Balls, Cum In Balls, Cum Shower, Fingering, Dark Magic Usage, Rimming, Cockring, Orgasm Denial, Blueballing, Hyper, Cock Vore, Cum Vore, Cum Digestion, Same-Size Vore, Unbirthing, Mindfuck, All The Way Through, Sucking Blood, Futa TF, Herm TF, Micro/Macro, Cum In Bladder, Urine In Bladder, Master/Pets, Tribadism, Pregnant Sex, 69ing, Shrinking, Bladder Vore, Urine Digestion, Vaginal Vore, Womb Vore, Male Impregnation, Self Impregnation, Autofellatio

Displaced story, though this was inspired by other displaced stories that went as themselves to the con before being displaced.

This story doesn't have foalcon because of the Anthro tag, rules are rules.

This story will also include fan-made mlp songs, including remixes of mlp songs and also canon mlp songs.

[Will not be doing crossovers with other displaced, but will be doing crossovers with my other stories that warrants this]

Will do the prologue when I get to writing it. <---(I will remove this when the prologue chapter is published)

Published 2022-12-31 11:00:01 UTC
Last updated 2023-06-22 07:35:48 UTC

Chapter 1: I'M KING FUCKING SOMBRA?!(TBU)

Something has gone wrong. We don't seem to have an archived copy of that chapter.