Ever-Changing Lies

by Pinkamena_Angel

Rating: everyone
Tags: Sad
Length: 153

Dinky is a Changeling.

Dinky has been hiding from Chrysalis for a long time, with Derpy as her protection. But now her protection is invalid. And Chrysalis is out for her. And whoever helps her.

Mainly told in dreams and flashbacks.

Published 1970-01-01 00:00:00 UTC
Last updated 2012-10-25 19:43:22 UTC

Chapter 1: The Truth Comes Out

Chrysalis approached Dinky and smiled. "I've been waiting for you." Dinky backed away slowly. She looked up at Chrysalis with fear. Chrysalis leered at her. "Oh no, you missunderstand me. We're not going to hurt you. Much."

"No! I'm not the one you want!" Dinky yelled, trying to understand. Chrysalis grabbed her and started to run. "NO! I'm NOT the one!" NO!" Dinky screamed in vain.

Dinky saw the dark colors of the hive, and an army of changelings. "Whaa..." They bowed to her. "Long live Princess Dinky!" Dinky sharply drew in her breath. It wasn't right. "It's not me... what's going on?"

Suddenly, Dinky woke up. She was covered in sweat. All she could feel was her bed. Everything was a blur. Derpy walked in. She opened her mouth... and nothing came out. In pictures like this. Hi are you awake? Dinky fainted.