SCPony: SCP-087

by SCP173IsPony

Rating: teen
Tags: Dark
Length: 367

[DATA EXPUNGED]

SCP-087

Object Class: Euclid

This the story of the Class-P (Pony) Subjects who explored SCP-087, the encounters with SCP-087-1, and a horrifying escape by the Class-P subjects.

At this point, it is unknown if SCP-087 really has an endpoint.

RATED TEEN FOR SWEARING

The stories will be short ones due I am following the SCP Documents (some of them). So if you don't like to read a short-storied fanfic, don't read this one!

Also my first fanfiction, please rate fairly

Published 1970-01-01 00:00:00 UTC
Last updated 2012-11-23 10:51:04 UTC

Document 087-I

P-97821 is an earth pony who is chosen to explore SCP-087. She was confirmed to be Applejack, she shines her floodlamp.

The door leading to SCP-087 is opened for P-97821

"Doc, 'ya sure about me goin' down this staircase?" P-97821 asks Dr. [REDACTED] about the SCP-087. "Yes. Please shine your flood lamp and illuminate the staircase". Dr. [REDACTED] replies to P-97821. "It's somehow dark in here, Doc. 'Ah can't even light a damn step of the staircase." P-98721 says to Dr. [REDACTED]. "Ok. Please proceed down the staircase." Dr. [REDACTED] replies to P-97821.

P-97821 descends the first 13 flights of stairs, placing a LED light at each staircase landing.

"Doc! 'Ah hear a filly down there! She's need some help!" P-98721 says through the radio.

"How far is the filly?" Dr. [REDACTED] asked. "Hm...'Ah dunno. 'Ah'm guessin' 150 to 200 meters down." P-98721 answered. "Ok, please proceed and tell us if you get closer." Dr. [REDACTED] said.

P-98721 descends to the next 25 floors.

"Doc, 'Ah don't think 'ah'm gettin' closer to the filly. It's like every step 'ah take, she takes one down." P-98721 said. "Please continue down the staircase, report to us if you get closer." Dr. [REDACTED] replies to P-98721. "But, Doc, 'Ah told 'ya, 'Ah'm not gettin' close to the filly." P-98721 replies.

"Sorry, but we had an agreement." Dr. [REDACTED] says. "Alright, fine." P-98721 replies.

P-98721 continues to descend 25 flights of stairs. She stops before going down the 26th stairs.

'Whoa, whoa, whoa, whoa, what the buck is that?! Holy shit, it looks scary. IT'S FUCKING SCARY!" P-98721 shouts out.

P-98721's camera shows the face of SCP-087-1, and begins to feel intense paranoia and fear.

"Please descend and illuminate the entity." Dr. [REDACTED] says to P-98721.

P-98721 is unresponsive and begins to have a quick ascend of the stairs.

"Please calm down and illuminate the entity." Dr. [REDACTED] said.

P-98721 is still unresponsive, the video feed begins the glitch while static noise is heard, then it transfers to bumpy video feeds of the P-98721 ascending the stairs. The subject opens the door and sits down on the floor.

P-98721 suffers a trauma that she has not yet recovered.