The Traveling Pony: Alternate Ending

by screenaholic

Rating: mature
Tags: Sex, Twilight Sparkle, Slice of Life, My Little Pony: Friendship is Magic, Romance, Original Character
Length: 1544

Twilight decides to tries an alternate method to make Wind Walker stay. (CLOP)

Twilight decides to tries an alternate method to make Wind Walker stay. (CLOP)

I decided to write this not out of a desire to get into writing clop, but as a curiosity to see if I could make a good clopfic. It's mostly a writing exercise, do not expect frequent clop stories from me.

Published 2013-07-01 21:40:02 UTC
Last updated 2013-07-01 21:40:02 UTC

Alternate Ending

Twilight was stunned by the entire situation as she stared at the necklace. "Wi-Wind Walker...I..." She struggled to find the right words to say. Finally, she lunged to Wind Walker and wrapped her hoof tightly around him in a hug. "Will...will I ever see you again." She could feel the tears stream down her face. She didn't want him to leave, she didn't want to lose her friend.

He returned her hug, and held her tight. "I'm not sure, but I hope so." They stood in each others legs for what seemed like an eternity that ended all to soon, before Wind Walker eventually broke it off. They stared into each others tear soaked eyes, and he wiped a tear off of her face. "...Goodbye Twilight." With that he turned and walked away.

No, I can't let him leave. Not like this. "Wind Walker!" Twilight shouted as she dropped the necklace and ran towards him.

He stopped and turned his head to face her. "Twil-nghf!" He was cut off as the purple mare pressed her lips against his and threw her legs around him, pulling him into a passionate kiss. He was stunned at first, but quickly returned the passion. Twilight savored the taste of his eager lips against hers as he ran a hoof through her mane. She could feel the seeds of emotion that had been planted over the last few days slowly start to bloom in her fluttering heart, and moistening marehood.

Twilight ran her hoof through his mane and across his back. She slid it down his side, and began to bring it near his crotch. As Wind Walker suddenly realized what she was doing, he finally broke the kiss. "Twilight wait. Are you sure that-"

"Shhh," she said putting a hoof to his lips. "It's okay. I want this, I want you." She again began the kiss, and continued her hoof's journey to his crotch. Twilight felt Wind Walker's member as it slowly slid out of its sheathe. She began stroking it, coaxing it to its full length. She broke the kiss and nipped his neck as he became fully erect.

"Twilight," he moaned. Twilight smiled and put a hoof on his chest, gently pushing him to sit leaned against a tree. As Wind Walker sat, Twilight stared longingly at his cock. She leaned her head down between his legs, closed her eyes, and slowly licked from the base to the head. She heard him moan in pleasure, and wrapped her lips and his tip.Twilight's tongue circled the girth before she lowered his head, slowly taking the throbbing erection into her mouth. She took it all in, lowering her lips all the way to the base.

Twilight held her head still for a moment, enjoying the feeling of Wind Walker's penis pressing against her tongue. As she felt her loins burning with desire, she rapidly lifted herself completely off, flicking the tip with her tongue as she did. "Twilight, that-" Twilight didn't wait for him to finish, but instead quickly took him back in her mouth and began bobbing her head up and down rapidly. She sucked hard and wiggled her tongue against his cock, listening to his increasingly rapid breath. "Twilight I'm, I'm..." Twilight quickened her speed, thirsting for what she knew was coming. She felt a hoof press against the back of her head and his dick throb violently as he squirted his cum into her mouth. She gulped each glob as it came out, and she could feel the heat settle in her stomach.

Twilight slowly slid his cock out of her mouth, dragging her tongue across it as she did. "I'm glad you liked-whoa!" Wind Walker had grabbed Twilight and pulled her to the ground on her back with a surprising mix of speed and gentleness. "Hehe, I like it when you take charge."

"Good," Wind Walker said as he rose. He stood over Twilight, and began gently kissing her neck. She moaned and he slowly started kissing his way down her body.

"Oh Wind Walker, yes." When he got between her legs, he kissed circles around her increasingly wet hole. "Please, Wind Walker. Plea-ahhh!" she gasped as she felt his tongue slide across her slit. He licked her up and down, before penetrating her with his wide flat tongue. She could feel it wiggle around inside her. "Wind Walker, Wind Walker." Her breathing rapidly increased, and she moaned every time the wriggling organ found her spot, which happened increasingly often. He began rubbing her clit with his hoof. "I'm almost, I'm almost, AHH!" She screamed as waves of ecstasy shot through her body. She could feel herself squeezing Wind Walker's tongue, and she wrapped her hind legs around his head.

Wind Walker continued lapping as Twilight rode out her orgasm, only stopping when her breathing finally slowed. He raised his head and stared into her eyes, his muzzle soaked in her fluids. "Wind Walker," Twilight said as she tried to catch her breath. "I...I think I love you."

Wind Walker smiled, and slowly leaned in to kiss her. The kiss was not as passionate as before, but it was loving. When Wind Walker broke the kiss, he nuzzled Twilight's neck. "I love you too Twilight."

Twilight kissed Wind Walker's neck, and her hoof made it's way to his crotch once again. "Do you really love me?"

"Yes Twilight," he said. Their bodies were pressed together, and Twilight could feel his heart quickening as her hoof made it's journey. "I love you."

Twilight wrapped her hoof around his re-erecting penis, and lightly pulled it towards her. "Then show me that you do."

Wind Walker pulled his head back, and looked into her eyes again before leaning in for another kiss. As they lost themselves in each other's mouths, Twilight could feel Wind Walker positioning himself on top of her. She moaned as his fully erect member touched her hole. Twilight instinctually grinded against it. "Are you ready?" Wind Walker asked.

"Yes, oh Celestia yes," Twilight responded. Wind Walker pressed his dick into her slowly, and twilight moaned as she felt it. Inch by inch, he filled her with his length, her walls hugging his cock tightly. "Oh Wind Walker...." As her hungry pussy swallowed the last glorious inch , Twilight was filled with a sense of fullness that she had never experienced in her life.

Twilight muttered to Wind Walker, but she was to quite for him to hear. "What was that?" he asked. She sat her upper body up, wrapping her forelegs around his neck and pulling herself in close.

"Fuck me," she whispered in his ear. With that, Wind Walker pulled himself slowly out of her, leaving only the tip in, before slamming back into her. "AH!" Twilight yelled. Again, he slowly pulled out and slammed his rod back in. "AH!" This time Twilight fell back onto her back, her forelegs splaying out. Wind Walker began to increase his speed, ramming himself into Twilight with every thrust.

"Wind Walker, Wind Walker!" They were the only words Twilight could process though the haze of bliss clouding her mind. She lifted her head and bit Wind Walker's neck, hearing a satisfying moan escape his throat as a result. Twilight could tell he had entered a state of frenzy as he increased his speed, and she began thrusting upwards in time with his rhythm.

"Wind Walker! Fuck me, fuck me, fuck m-AHHHHH!!!!" She wrapped her hindlegs around Wind Walker and threw her head back as the heat building inside her finally reached it's limits. Her pussy clenched even tighter around Wind Walker, and she squirted on to his cock as she orgasmed.

"Twilight," Wind Walker grunted. The increased pressure from Twilight's orgasm sent him over the top. Twilight yelled even louder as she felt Wind Walker's hot sticky cum pour into her, filling her womb with a sense of warmth and pleasure. He continued pumping into Twilight, but slowed his rhythm as they both rode out their orgasms. When they both began to bottom out, they joined once more in a loving kiss. As the climaxes finally finished, Wind Walker slowly pulled himself out from Twilight, and laid next to her.

Twilight could feel their mixed fluids still inside her, but she didn't care. She pulled herself next to Wind Walker, resting her head on his chest as he wrapped his forelegs around her. They laid there on the grass, Twilight completely unaware of the outside world. All she felt was was Wind Walker's hoof stroking gently through her hair, and the rise and fall of his chest as she listened to his breathing. After what seemed like an eternity that ended all to soon, Twilight finally broke the silence. "Wind Walker?"

"Hmm?"

Twilight lifted her head off of Wind Walker's chest and looked into his eyes. "Does this mean you aren't leaving?"

Wind Walker smiled, and gave Twilight a gentle but affectionate kiss. "Yes Twilight, I'm not going anywhere. Not without you."

Twilight laid her head back on his chest. "I love you Wind Walker."

"I love you too Twilight."

Author's Note

Well I hope you all enjoyed! Tell me what you think, I always love hearing from the readers.